50 100 150 200 250 300 350 400

50 100 150

θ (degrees) dσ/dΩ

-0.05

-0.04

-0.03

-0.02

-0.01 0 0.01

0.02

0.03

0 100

θ (degrees)

T_{20}

-0.01

-0.005 -0 0.005

0.01

0.015

0.02

0.025

0.03

0 100

θ (degrees)

T_{21}

-0.04

-0.035

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005 0

0 100

θ (degrees)

T_{22}

0 0.005

0.01

0.015

0.02

0.025

0.03

0 100

θ (degrees) i T_{11}

0 0.01

0.02

0.03

0.04

0.05

0.06

0 100

θ (degrees)

A_y

E_p=3.0 MeV