200 220 240 260 280 300 320 340 360 380 400

50 100 150

θ (degrees) dσ/dΩ

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005 -0 0.005

0.01

0.015

0.02

0 100

θ (degrees)

T_{20}

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

0 100

θ (degrees)

T_{21}

-0.01

-0.009

-0.008

-0.007

-0.006

-0.005

-0.004

-0.003

-0.002

-0.001 0

0 100

θ (degrees)

T_{22}

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 x 10^{-2}

0 100

θ (degrees) i T_{11}

0 0.001

0.002

0.003

0.004

0.005

0.006

0.007

0.008

0 100

θ (degrees)

A_y

E_p=0.65 MeV^{+contact}

AV18 AV18+UIX