5−10^{4−}10^{3−}10^{2−}10^{1−}10 1 10^210^310^410 r [pc] 1 10 210 310 410 510 610 710 810 910 10 10 11 10 12 10

]^3 [GeV/cm ρ

=0.06 α Einasto profile: =0.09 α Einasto profile: =0.11 α Einasto profile: =0.15 α Einasto profile: =0.17 α Einasto profile: Di Cintio profile