56600 56700 56800 56900 57000 57100 57200 14 12 10 8 6

1.5 1.0 0.5 0.0 -0.5

-1.0

-1.5

V Rc-Ic B-V U-B V-Rc

V

JD 2400000+

C.I.

0 100 200 300 400 500 600 700 days