0

100

200

300

400

500

600

700

Predicted State

Expt. States

H-

H

G-

G

D-

D

B-

B

A- A I-

I

F-

E- C-

E

F

(4160-4040)

(3772-3686)

Our Results

(4630-4443)

(4443-4263) (4421-4263)

(4263-4040)

(4630-4421)

(4040-3686)

(3686-3097)

(n+1)S-nS

(6S-5S)

(5S-4S)

(4S-3S)

(3S-2S) (2S-1S)

Mv

Energy level difference in MeV

C