h -4 10^{-3}10^{-2}10

W(h,k)/V

-10 10

-9 10

-8 10

-7 10

-6 10

-5 10

-4 10

-3 10

Free energy at small h values

h 1 10^210^310^410

W(h,k)/V

-3 10

-2 10

-1 10

1

10

210

310

Free energy at large h values

h -4 10^{-3}10^{-2}10^{-1}10 1 10^210^310^410

W(h,k)/V

-9 10 -8 10 -7 10 -6 10 -5 10 -4 10 -3 10 -2 10 -1 10 1 10 210 310

k=0

/72 π 2× k=1

/72 π 2× k=2 /72 π 2× k=3

/72 π 2× k=5

/72 π 2× k=8

/72 π 2× k=12

/72 π 2× k=16 /72 π 2× k=24

/72 π 2× k=36

Free energy