a [fm]

0.1 0.15 0.2

L [fm]

10 20 30 40

0 W/W

0 0.1 0.2 0.3 0.4

2d case a [fm]

0.05 0.1 0.15 0.2

L [fm]

2 4 6 8 10 12 14

0 W/W

0

0.2

0.4

3d case a [fm]

0.1 0.15 0.2

L [fm]

1 2 3 4

0 W/W

0 0.1 0.2 0.3 0.4 0.5

4d case

a [fm]

0 0.05 0.1 0.15 0.2

0 W/W

0

0.1

0.2

0.3

0.4

2 dimensions

3 dimensions

4 dimensions

Continuum limit