5 10 15 20 25 1.5

2.0

2.5

3.0

3.5 m (GeV)

M2 (GeV2)

D_1(2420) with s_0=7 GeV^2 D_1(2460) with s_0=7.5 GeV^2

5 10 15 20 25

1.5

2.0

2.5

3.0

3.5