CONT: NGC6240 IPOL 4990.240 MHZ N6240SC.ICL001.3

Cont peak flux = 1.1767E-03 JY/BEAM Levs = 8.839E-05 * (-3, 3, 5, 7, 9, 11, 13)

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

16 52 58.892 58.891 58.890 58.889 58.888 58.887 58.886

02 24 03.39

03.38

03.37

03.36

03.35

03.34

03.33

03.32

03.31

03.30

03.29