CONT: NGC6240 IPOL 1653.740 MHZ NGC6240.ICL001.9

Cont peak flux = 1.1315E-03 JY/BEAM Levs = 1.333E-04 * (-3, 3, 4, 5, 6, 7, 8, 9)

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

16 52 58.894 58.892 58.890 58.888 58.886

02 24 03.46

03.44

03.42

03.40

03.38

03.36

03.34

03.32

03.30

03.28

03.26