(GeV/c) lab p^-K

0 1 2 3 4 5 6 7 8 9 10 counts

10

210

- all K *k* 30.3 % *k1 2.2 % *k0 2.2 % *kaon.N 2.8 % Lambda 5.5 % N.N 3.0 % Sigma 6.2 % Sigma.pion 3.5 % Xi 2.9 % a0 4.4 % f0 3.5 % phi 4.2 % others 29.4 %